{"text_format":"dbase-jsonl-2026-09-30","columns":[{"name":"ID","type":"number","width":11,"decimals":0},{"name":"OBJTYP","type":"number","width":11,"decimals":0},{"name":"UNITID","type":"number","width":11,"decimals":0},{"name":"UNITTYP","type":"number","width":11,"decimals":0},{"name":"NAME","type":"character","width":80},{"name":"EXTOBJT","type":"number","width":11,"decimals":0},{"name":"CEXTTYPE","type":"character","width":250},{"name":"LASTID","type":"number","width":11,"decimals":0},{"name":"RSLOCK","type":"number","width":11,"decimals":0},{"name":"USLOCK","type":"number","width":11,"decimals":0},{"name":"UXLOCK","type":"number","width":11,"decimals":0},{"name":"DPSUBSN","type":"number","width":11,"decimals":0},{"name":"SUBSTATN","type":"number","width":11,"decimals":0},{"name":"MODULN","type":"number","width":11,"decimals":0},{"name":"SUBMODN","type":"number","width":11,"decimals":0},{"name":"OBJLEVEL","type":"number","width":11,"decimals":0},{"name":"CREATE","type":"character","width":10},{"name":"MODIFIED","type":"character","width":10}],"n_rows":15,"rows_kept":15,"cut":false,"deleted_skipped":0,"read_ended":"whole","bounds":"16MiB/16384/4096/first_that_fit","version":"dbase_level_three","encoding_class":"enc_absent","reader":"statdb_count/12"}
[9,1314972,7,1314969,"_S7H_BUSSYSTEM_CT",0,null,0,0,2,2100,-1,-1,-1,-1,0,"\u0002\u0014ò~\u0019v\u0001","\u0003*ÇV\u001a\u0098½"]
[8,1315075,7,1314969,"Hardware",0,null,0,0,2,2100,-1,-1,-1,-1,0,"\u0002\u0014á¼\u0019v","\u0002?\u008b\u001a\u0017\u0003"]
[7,1314969,23,1122305,"Stacja z CPU 313",0,null,0,0,2,2100,-1,-1,-1,-1,5,"\u0002\u0014á¼\u0019v","\u0002\u001e\u001b\u0088\u001aô"]
[6,1314972,4,1314969,"P_ADR_BUS",0,null,0,0,2,2100,-1,-1,-1,-1,0,"\u0002\u0014à@\u0019v","\u0001é3ª\u0019B½"]
[5,1315075,4,1314969,"Hardware",0,null,0,0,2,2100,-1,-1,-1,-1,0,"\u0002\u0014²¾\u0019v","\u0002?\u008b\u001a\u0017\u0003"]
[4,1314969,23,1122305,"Stacja z CPU 315-2DP",0,null,0,0,2,2100,-1,-1,-1,-1,5,"\u0002\u0014²\u008c\u0019v","\u0002\u001dój\u001aô"]
[3,1314972,1,1314970,"_S7H_BUSSYSTEM_CT",0,null,0,0,2,2100,-1,-1,-1,-1,0,"\u0002\u0014±B\u0019v","\u0003\u009f\u000f\b\u001b\u0080"]
[2,1315075,1,1314970,"Hardware",0,null,0,0,2,2100,-1,-1,-1,-1,0,"\u0002\u0014r,\u0019v","\u0003\b\u0015\u0080\u0019I"]
[1,1314970,23,1122305,"Stacja z CPU 412-1",0,null,0,0,2,2100,-1,-1,-1,-1,5,"\u0002\u0014pâ\u0019vs","\u0003\u009f\u000f:\u001b\u0080X"]
[11,1315075,10,1314969,"Hardware",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0001\u0088&x\u001b\u0000V","\u0001\u0088&x\u001b\u0000V"]
[10,1314969,11,1122305,"Stacja z CPU 312",0,null,0,0,3,2100,-1,-1,-1,-1,5,"\u0001\u0088&x\u001b","\u0001·@l {"]
[12,1314972,10,1314969,"P_ADR_BUS",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0001\u0089dÞ\u001b","\u0001·?c {"]
[15,1314972,13,1314969,"P_ADR_BUS",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0003bô\u0096\u001dý","\u0003c\u008cD\u001dý"]
[14,1315075,13,1314969,"Hardware",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0003bâX\u001dý\u0090\u0003","\u0001\u0088&x\u001b\u0000V"]
[13,1314969,31,1122305,"Stacja z CPU 313C",0,null,0,0,3,2100,-1,-1,-1,-1,5,"\u0003báê\u001dý","\u0003c\u008cî\u001dý"]