{"text_format":"dbase-jsonl-2026-09-30","columns":[{"name":"ID","type":"number","width":11,"decimals":0},{"name":"OBJTYP","type":"number","width":11,"decimals":0},{"name":"UNITID","type":"number","width":11,"decimals":0},{"name":"UNITTYP","type":"number","width":11,"decimals":0},{"name":"NAME","type":"character","width":80},{"name":"EXTOBJT","type":"number","width":11,"decimals":0},{"name":"CEXTTYPE","type":"character","width":250},{"name":"LASTID","type":"number","width":11,"decimals":0},{"name":"RSLOCK","type":"number","width":11,"decimals":0},{"name":"USLOCK","type":"number","width":11,"decimals":0},{"name":"UXLOCK","type":"number","width":11,"decimals":0},{"name":"DPSUBSN","type":"number","width":11,"decimals":0},{"name":"SUBSTATN","type":"number","width":11,"decimals":0},{"name":"MODULN","type":"number","width":11,"decimals":0},{"name":"SUBMODN","type":"number","width":11,"decimals":0},{"name":"OBJLEVEL","type":"number","width":11,"decimals":0},{"name":"CREATE","type":"character","width":10},{"name":"MODIFIED","type":"character","width":10}],"n_rows":1,"rows_kept":1,"cut":false,"deleted_skipped":0,"read_ended":"whole","bounds":"16MiB/16384/4096/first_that_fit","version":"dbase_level_three","encoding_class":"enc_absent","reader":"statdb_count/12"}
[1,1314873,1,1315547,"PS407 4A",0,null,0,0,2,2100,0,0,1,0,2,"\u0002\u0014\u007fì\u0019v","\u0003\b\u0091\u0018\u0019I"]