{"text_format":"dbase-jsonl-2026-09-30","columns":[{"name":"ID","type":"number","width":11,"decimals":0},{"name":"OBJTYP","type":"number","width":11,"decimals":0},{"name":"UNITID","type":"number","width":11,"decimals":0},{"name":"UNITTYP","type":"number","width":11,"decimals":0},{"name":"NAME","type":"character","width":80},{"name":"EXTOBJT","type":"number","width":11,"decimals":0},{"name":"CEXTTYPE","type":"character","width":250},{"name":"LASTID","type":"number","width":11,"decimals":0},{"name":"RSLOCK","type":"number","width":11,"decimals":0},{"name":"USLOCK","type":"number","width":11,"decimals":0},{"name":"UXLOCK","type":"number","width":11,"decimals":0},{"name":"DPSUBSN","type":"number","width":11,"decimals":0},{"name":"SUBSTATN","type":"number","width":11,"decimals":0},{"name":"MODULN","type":"number","width":11,"decimals":0},{"name":"SUBMODN","type":"number","width":11,"decimals":0},{"name":"OBJLEVEL","type":"number","width":11,"decimals":0},{"name":"CREATE","type":"character","width":10},{"name":"MODIFIED","type":"character","width":10}],"n_rows":6,"rows_kept":6,"cut":false,"deleted_skipped":2,"read_ended":"whole","bounds":"16MiB/16384/4096/first_that_fit","version":"dbase_level_three","encoding_class":"enc_absent","reader":"statdb_count/12"}
[5,1314972,3,1314969,"P_ADR_BUS",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0003£¿\u0086\"Ã","\u0003\"WZ#U"]
[4,1315075,3,1314969,"Hardware",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0003£²ô\"Ã","\u0003£²ô\"Ã"]
[3,1314969,4,1122305,"SIMATIC 312",0,null,0,0,3,2100,-1,-1,-1,-1,5,"\u0003£²\t\"Ã","\u0003\"X\u0006#U"]
[8,1314972,6,1314969,"P_ADR_BUS",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0003\"±a#U","\u0003>W°#U"]
[7,1315075,6,1314969,"Hardware",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0003\"\u0094c#U\f\u0005","\u0003£²ô\"Ã"]
[6,1314969,666,1122305,"SIMATIC 313C",0,null,0,0,3,2100,-1,-1,-1,-1,5,"\u0003\"\u00944#U","\u0003>X\u008a#U"]