{"text_format":"dbase-jsonl-2026-09-30","columns":[{"name":"ID","type":"number","width":11,"decimals":0},{"name":"OBJTYP","type":"number","width":11,"decimals":0},{"name":"UNITID","type":"number","width":11,"decimals":0},{"name":"UNITTYP","type":"number","width":11,"decimals":0},{"name":"NAME","type":"character","width":80},{"name":"EXTOBJT","type":"number","width":11,"decimals":0},{"name":"CEXTTYPE","type":"character","width":250},{"name":"LASTID","type":"number","width":11,"decimals":0},{"name":"RSLOCK","type":"number","width":11,"decimals":0},{"name":"USLOCK","type":"number","width":11,"decimals":0},{"name":"UXLOCK","type":"number","width":11,"decimals":0},{"name":"DPSUBSN","type":"number","width":11,"decimals":0},{"name":"SUBSTATN","type":"number","width":11,"decimals":0},{"name":"MODULN","type":"number","width":11,"decimals":0},{"name":"SUBMODN","type":"number","width":11,"decimals":0},{"name":"OBJLEVEL","type":"number","width":11,"decimals":0},{"name":"CREATE","type":"character","width":10},{"name":"MODIFIED","type":"character","width":10}],"n_rows":15,"rows_kept":15,"cut":false,"deleted_skipped":9,"read_ended":"whole","bounds":"16MiB/16384/4096/first_that_fit","version":"dbase_level_three","encoding_class":"enc_absent","reader":"statdb_count/12"}
[6,1314972,4,1314969,"_S7H_BUSSYSTEM_CT",0,null,0,0,2,2100,-1,-1,-1,-1,0,"\u0003¥\u0081Ð\u0019@","\u0003§A(\u0019@½"]
[5,1315075,4,1314969,"Hardware",0,null,0,0,2,2100,-1,-1,-1,-1,0,"\u0003¥sÞ\u0019@","\u0002?\u008b\u001a\u0017\u0003"]
[4,1314969,544,1122305,"Stacja z CPU 313",0,null,0,0,2,2100,-1,-1,-1,-1,5,"\u0003¥sÞ\u0019@","\u0001è\u0092$\u0019B"]
[15,1314972,13,1314969,"P_ADR_BUS",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0001訤\u0019B","\u0001é3ª\u0019B½"]
[14,1315075,13,1314969,"Hardware",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0001è¢<\u0019B","\u0002?\u008b\u001a\u0017\u0003"]
[13,1314969,68,1122305,"Stacja z CPU 315-2DP",0,null,0,0,3,2100,-1,-1,-1,-1,5,"\u0001è¢\u0000\u0019B","\u0003á2¬\u0019Ä"]
[18,1314972,16,1314970,"_S7H_BUSSYSTEM_CT",0,null,0,0,2,2100,-1,-1,-1,-1,0,"\u0003J\u0011°\u0019I^","\u0003\u009fß\u0096\u001b\u0080"]
[17,1315075,16,1314970,"Hardware",0,null,0,0,2,2100,-1,-1,-1,-1,0,"\u0003Iø\u0092\u0019I","\u0003\b\u0015\u0080\u0019I"]
[16,1314970,53,1122305,"Stacja z CPU 412-1",0,null,0,0,2,2100,-1,-1,-1,-1,5,"\u0003Iø$\u0019I","\u0003\u009fßÈ\u001b\u0080X"]
[21,1314972,19,1314969,"P_ADR_BUS",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0002?å´\u001b\u000f","\u0001¸\u0083Ù {½"]
[20,1315075,19,1314969,"Hardware",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0002?ދ\u001b\u000f","\u0002?\u008b\u001a\u0017\u0003"]
[19,1314969,353,1122305,"Stacja z CPU 312",0,null,0,0,3,2100,-1,-1,-1,-1,5,"\u0002?ÞY\u001b\u000f","\u0001¸\u0084ã {"]
[24,1314972,22,1314969,"P_ADR_BUS",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0003<%¾\u001eC","\u0003<î\"\u001eC½"]
[23,1315075,22,1314969,"Hardware",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0003<!¤\u001eC","\u0002?\u008b\u001a\u0017\u0003"]
[22,1314969,10,1122305,"Stacja z CPU 313C",0,null,0,0,3,2100,-1,-1,-1,-1,5,"\u0003<!\u0004\u001eCá","\u0003>é\u008e\u001eC"]