{"text_format":"dbase-jsonl-2026-09-30","columns":[{"name":"ID","type":"number","width":11,"decimals":0},{"name":"OBJTYP","type":"number","width":11,"decimals":0},{"name":"UNITID","type":"number","width":11,"decimals":0},{"name":"UNITTYP","type":"number","width":11,"decimals":0},{"name":"NAME","type":"character","width":80},{"name":"EXTOBJT","type":"number","width":11,"decimals":0},{"name":"CEXTTYPE","type":"character","width":250},{"name":"LASTID","type":"number","width":11,"decimals":0},{"name":"RSLOCK","type":"number","width":11,"decimals":0},{"name":"USLOCK","type":"number","width":11,"decimals":0},{"name":"UXLOCK","type":"number","width":11,"decimals":0},{"name":"DPSUBSN","type":"number","width":11,"decimals":0},{"name":"SUBSTATN","type":"number","width":11,"decimals":0},{"name":"MODULN","type":"number","width":11,"decimals":0},{"name":"SUBMODN","type":"number","width":11,"decimals":0},{"name":"OBJLEVEL","type":"number","width":11,"decimals":0},{"name":"CREATE","type":"character","width":10},{"name":"MODIFIED","type":"character","width":10}],"n_rows":18,"rows_kept":18,"cut":false,"deleted_skipped":0,"read_ended":"whole","bounds":"16MiB/16384/4096/first_that_fit","version":"dbase_level_three","encoding_class":"enc_absent","reader":"statdb_count/12"}
[9,1314972,7,1314969,"P_ADR_BUS",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0002¶Ìè\u001au","\u0001ÆÂp\u0017\u001e\u0011"]
[8,1315075,7,1314969,"Hardware",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0002¶Ã\u0006\u001au","\u0001ÀWd\u0017\u001e"]
[7,1314969,41,1122305,"Stacja 312IFM",0,null,0,0,3,2100,-1,-1,-1,-1,5,"\u0002¶Ã\u0006\u001au","\u0002º6Æ\u001au"]
[6,1314972,4,1314969,"P_ADR_BUS",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0002¶Ã\u0006\u001au","\u0002à[\u0080\u001a{½"]
[5,1315075,4,1314969,"Hardware",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0002¶¸¶\u001au","\u0002?\u008b\u001a\u0017\u0003"]
[4,1314969,41,1122305,"Stacja 313",0,null,0,0,3,2100,-1,-1,-1,-1,5,"\u0002¶¸\u0084\u001auV","\u0002à[î\u001a{"]
[3,1314972,1,1314969,"P_ADR_BUS",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0002¶¸\u0084\u001au","\u0002Æ¥<\u0017ü"]
[2,1315075,1,1314969,"Hardware",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0002¶\u009fÔ\u001au","\u0001À'ø\u0017\u001e"]
[1,1314969,41,1122305,"Stacja 315",0,null,0,0,3,2100,-1,-1,-1,-1,5,"\u0002¶\u009c \u001au","\u0002ºD¸\u001au"]
[11,1315075,10,1314970,"Hardware",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0002¸C¶\u001auV","\u0002¸C¶\u001auV"]
[10,1314970,41,1122305,"Stacja 412-1",0,null,0,0,3,2100,-1,-1,-1,-1,5,"\u0002¸C\u0084\u001auw","\u0003T±$\u001a\u0097w"]
[12,1314972,10,1314970,"P_ADR_BUS",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0002¸é\u0092\u001au","\u0003T°¶\u001a\u0097"]
[14,1315075,13,1314969,"Hardware",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0001¸à$\u001aþac","\u0001¸à$\u001aþac"]
[13,1314969,54,1122305,"Stacja 312",0,null,0,0,3,2100,-1,-1,-1,-1,5,"\u0001¸Þ¨\u001aþ","\u0001î\u008d)!ò"]
[15,1314972,13,1314969,"P_ADR_BUS",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0001¹ÁØ\u001aþ","\u0001¹Åb {"]
[18,1314972,16,1314969,"P_ADR_BUS",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0003KG°\u001dý","\u0003L\u0081\\\u001dý"]
[17,1315075,16,1314969,"Hardware",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0003K=Ø\u001dý\u0093\u0003","\u0001¸à$\u001aþa"]
[16,1314969,19,1122305,"Stacja 313C",0,null,0,0,3,2100,-1,-1,-1,-1,5,"\u0003K=\u009c\u001dý","\u0001íMV!ò"]