{"text_format":"dbase-jsonl-2026-09-30","columns":[{"name":"ID","type":"number","width":11,"decimals":0},{"name":"OBJTYP","type":"number","width":11,"decimals":0},{"name":"UNITID","type":"number","width":11,"decimals":0},{"name":"UNITTYP","type":"number","width":11,"decimals":0},{"name":"NAME","type":"character","width":80},{"name":"EXTOBJT","type":"number","width":11,"decimals":0},{"name":"CEXTTYPE","type":"character","width":250},{"name":"LASTID","type":"number","width":11,"decimals":0},{"name":"RSLOCK","type":"number","width":11,"decimals":0},{"name":"USLOCK","type":"number","width":11,"decimals":0},{"name":"UXLOCK","type":"number","width":11,"decimals":0},{"name":"DPSUBSN","type":"number","width":11,"decimals":0},{"name":"SUBSTATN","type":"number","width":11,"decimals":0},{"name":"MODULN","type":"number","width":11,"decimals":0},{"name":"SUBMODN","type":"number","width":11,"decimals":0},{"name":"OBJLEVEL","type":"number","width":11,"decimals":0},{"name":"CREATE","type":"character","width":10},{"name":"MODIFIED","type":"character","width":10}],"n_rows":15,"rows_kept":15,"cut":false,"deleted_skipped":0,"read_ended":"whole","bounds":"16MiB/16384/4096/first_that_fit","version":"dbase_level_three","encoding_class":"enc_absent","reader":"statdb_count/12"}
[9,1314972,7,1314970,"P_ADR_BUS",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0003F\u0001L\u0019l","\u0003\u009bNê\u001b\u0080"]
[8,1315075,7,1314970,"Hardware",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0003Eùþ\u0019l","\u0003\"Ժ\u0019H"]
[7,1314970,124,1122305,"SIMATIC 412-1",0,null,0,0,3,2100,-1,-1,-1,-1,5,"\u0003Eùþ\u0019l4","\u0003\u009bO\u001c\u001b\u0080P"]
[6,1314972,4,1314969,"P_ADR_BUS",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0003Eùþ\u0019l","\u0001ÅIr\u0019û"]
[5,1315075,4,1314969,"Hardware",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0003E÷¦\u0019l","\u0001Á\u0000t\u0018ú"]
[4,1314969,124,1122305,"SIMATIC 313",0,null,0,0,3,2100,-1,-1,-1,-1,5,"\u0003E÷¦\u0019l","\u0001ÅI®\u0019û"]
[3,1314972,1,1314969,"P_ADR_BUS",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0003Eõ¼\u0019l","\u0003\"\u0088\\\u0019I"]
[2,1315075,1,1314969,"Hardware",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0003Eé\n\u0019l","\u0002¾µ4\u0018Ð"]
[1,1314969,124,1122305,"SIMATIC 315-2DP",0,null,0,0,3,2100,-1,-1,-1,-1,5,"\u0003Eè8\u0019l","\u0003\"Ǥ\u0019I"]
[12,1314972,10,1314969,"P_ADR_BUS",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0001°úl\u001b\u0005","\u0001¯à= {"]
[11,1315075,10,1314969,"Hardware",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0001°øæ\u001b\u0005","\u0001Á\u0000t\u0018ú"]
[10,1314969,16,1122305,"SIMATIC 312",0,null,0,0,3,2100,-1,-1,-1,-1,5,"\u0001°øæ\u001b\u0005","\u0001¯áf {"]
[15,1314972,13,1314969,"P_ADR_BUS",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0003Z\\\u0096\u001dý","\u0003ZûV\u001dý"]
[14,1315075,13,1314969,"Hardware",0,null,0,0,3,2100,-1,-1,-1,-1,0,"\u0003ZS\"\u001dý\u0001","\u0001Á\u0000t\u0018ú"]
[13,1314969,21,1122305,"SIMATIC 313C",0,null,0,0,3,2100,-1,-1,-1,-1,5,"\u0003ZRæ\u001dý\u0092","\u0003Zü\u0000\u001dý"]